== Noteworthy SL Changes Since Last Release of SL 7 ==
NOTE: This section documents changes made to SL specific packages since
      the last SL release. +
      This section does not list changes inherited from Upstream unless
      absolutely necessary.

.SL Install DVD
The 4.7Gb install disk for Scientific Linux 7 has been discontinued.

.OpenAFS
With SL 7.3 OpenAFS has been updated to version 1.6.20 the latest upstream stable.

.sl-release
There is a new Scientific Linux End User License Agreement (EULA).
The EULA now contains information about the U.S. Government contract
under which Fermilab produces Scientific Linux.

.anaconda-addon-org_scientificlinux_contexts
The Scientific Linux context plugin has been altered to be less aggressive in
its use of network resources.  Several isolated crash reports and unexpected
network bugs have been addressed.
Now Context Data should only be fetched for users selecting context items.

// vim: set syntax=asciidoc:
